Homework 6. Part A & B. (see weighted automaton) Part C. P("pcl p er m ax nx ix n q" ) = 1*1*1*(1/8)*1*(2/3)*(1/2)*(1/6)*1 = 0.0069444 Part D. The most probable pronunciation is “pcl p er m ix nx ix q” P(“pcl p er m ix nx ix q”) = 1*1*1*(1/2)*(1/2)*(2/3)*(1/2)*1 = 0.083333

M
                N

                                   Q

                                N

                                           T

½

¼

½

½

½

½

P