pop pop pop

0 0.5 1 1.5 2 2.5 3 3.5 u-g

SDSS (mErr<0.01 mag) vs. Kurucz models

pop pop pop pop pop pop pop pop pop pop pop pop

pop pop pop0 0.5 1 1.5 g-r

pop pop pop0 0.5 1 1.5 r-i